  ▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄
  BET = TRUE COUNT
  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀

  When this setting is set to 'Y'es, if the
  count is less or equal to 0, 1 UNIT is bet,
  otherwise the bet size is equal to the TRUE
  COUNT.

  The maximum the bet size can be is determined
  by the "BETTING RATIO" setting.
